0

50

100

150

200

250

0 50 100 150 200 250

10^2

10^3

10^4

10^5

0 50 100 150 200 250

0

50

100

150

200

250

0 50 100 150 200 250

e^-e^- beams with E_e = 250 GeV

Generated E_1 ΜGeVΝ

E_2 ΜGeVΝ

E_γ ΜGeVΝ

Φevents

MC CompAZ

CompAZ E_1 ΜGeVΝ

E_2 ΜGeVΝ

0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

Ratio E_1 ΜGeVΝ

E_2 ΜGeVΝ

0

50

100

150

200

250

0 50 100 150 200 250