0

1

2

3

0 0.25 0.5 0.75 1 -1

-0.5

0

0.5

1

0 0.25 0.5 0.75 1

-40

-20

0

20

40

0 0.2 0.4 0.6 0.8 1

CompAZ parametrization of E_γ for E_e=100GeV x_{γ2}Γ0.4

x_γ

P(x)=dn/dx x_γ λ(x) x_γ

ΔP(x) ΜΨΝ x_γ

Δλ(x)

-0.2

0

0.2

0 0.2 0.4 0.6 0.8 1